!*  Schedule for VLBA_FD   *!
!*  Experiment GR024A   *!
!* Schedule Version:       1.00 *!
!* Processed by SCHED version: Release of 18 Sept. 2003 *!
!* PI:       R. Ramachandran *!
!* Address:  Dept of Astronomy, *!
!*           University of California at Berkeley *!
!*           Berkeley, CA 94720 *!
!*            U.S.A. *!
!* Phone:    510 642 6111 *!
!* EMAIL:    ramach@astron.berkeley.edu *!
!* Fax:      510 642 3411 *!
!* Phone during observation: 510 642 6111 *!
!* Observing mode: 92cm 256-8-2 *!
!* Notes: *!
!*  *!
!*  *!
!*  *!
!*  Start at 17h30m00s     Thu, 2004 Oct 21  Day of year  295   *!
program=GR024A  
autoallocate=on
autoreverse=on

!* The first scan is preceeded by a setup scan *!
!* that ends at the start time of the first scan  *!

!* --- Scan from 17h30m00s to 17h31m15s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=999  calib='N'
maxcaltime= 120
fe=(2,90cm),(4,90cm)
fexfer=(2,norm)
noise=(1,low-s),(2,low-s),(3,low-s),(4,low-s)
synth=( 1,15.4),( 2,15.4),( 3,15.4)
logging=STANDARD
nchan= 8
format=VLBA1:2
barrel=roll_auto
ifdistr=(1,0),(2,0),(3,0),(4,0)
baseband=(1,1),(2,2),(3,3),(4,4),(5,5),(6,6),(7,7),(8,8)
ifchan=(1,B),(2,D),(3,B),(4,D),(5,B),(6,D),(7,B),(8,D)
sideband=(1,U),(2,U),(3,U),(4,U),(5,U),(6,U),(7,U),(8,U)
bits=(1,2),(2,2),(3,2),(4,2),(5,2),(6,2),(7,2),(8,2)
period=(1,1),(2,1),(3,1),(4,1),(5,1),(6,1),(7,1),(8,1)
level=(1,-1),(2,-1),(3,-1),(4,-1),(5,-1),(6,-1),(7,-1),(8,-1)
azcolim=   0.00  elcolim=   0.00
bbsynth=( 1,811.99),( 2,811.99),( 3,819.99),( 4,819.99),( 5,827.99),( 6,827.99)
bbsynth=( 7,835.99),( 8,835.99)
bbfilter=(1,8M),(2,8M),(3,8M),(4,8M),(5,8M),(6,8M),(7,8M),(8,8M)
pcal=OFF
pcalxbit1=(1,S1),(2,S2),(3,S3),(4,S4),(5,S5),(6,S6),(7,S7),(8,S8)
pcalxbit2=(1,M1),(2,M2),(3,M3),(4,M4),(5,M5),(6,M6),(7,M7),(8,M8)
pcalxfreq1=(1,0),(2,0),(3,0),(4,0),(5,0),(6,0),(7,0),(8,0)
pcalxfreq2=(1,0),(2,0),(3,0),(4,0),(5,0),(6,0),(7,0),(8,0)
samplerate=16M
tape=(1,STOP) write=(1,off)
  date = 2004Oct21
stop=17h30m00s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=17h31m15s   !NEXT!

!* --- Scan from 17h31m15s to 17h33m40s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h33m40s   !NEXT!

!* --- Scan from 17h33m40s to 17h34m55s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=  0  calib='N'
tape=(1,+RUN)  write=(1,on)
stop=17h34m55s   !NEXT!

!* --- Scan from 17h34m55s to 17h37m20s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h37m20s   !NEXT!

!* --- Scan from 17h37m20s to 17h38m35s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=  0  calib='N'
tape=(1,+RUN)  write=(1,on)
stop=17h38m35s   !NEXT!

!* --- Scan from 17h38m35s to 17h41m00s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h41m00s   !NEXT!

!* --- Scan from 17h41m00s to 17h42m15s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=  0  calib='N'
tape=(1,+RUN)  write=(1,on)
stop=17h42m15s   !NEXT!

!* --- Scan from 17h42m15s to 17h44m40s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h44m40s   !NEXT!

!* --- Scan from 17h44m40s to 17h45m55s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=  0  calib='N'
tape=(1,+RUN)  write=(1,on)
stop=17h45m55s   !NEXT!

!* --- Scan from 17h45m55s to 17h48m20s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h48m20s   !NEXT!

!* --- Scan from 17h48m20s to 17h49m35s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=  0  calib='N'
tape=(1,+RUN)  write=(1,on)
stop=17h49m35s   !NEXT!

!* --- Scan from 17h49m35s to 17h52m00s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=  0  calib='G'
tape=(1,+RUN)  write=(1,on)
stop=17h52m00s   !NEXT!

!* --- Scan from 17h52m40s to 17h53m55s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=999  calib='N'
tape=(1,STOP) write=(1,off)
stop=17h52m40s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=17h53m55s   !NEXT!

!* --- Scan from 17h54m35s to 17h57m15s   Thu, 2004 Oct 21 --- *!
sname='B1534+12'  ra=15h37m09.960323s  dec= 11d55'55.55186"  qual=999  calib='G'
tape=(1,STOP) write=(1,off)
stop=17h54m35s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=17h57m15s   !NEXT!

!* --- Scan from 17h57m55s to 17h59m10s   Thu, 2004 Oct 21 --- *!
sname='J1540+1447'  ra=15h40m49.491512s  dec= 14d47'45.88485"  qual=999  calib='N'
tape=(1,STOP) write=(1,off)
stop=17h57m55s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=17h59m10s   !NEXT!

!* --- Scan from 17h59m50s to 18h01m20s   Thu, 2004 Oct 21 --- *!
sname='J1651+0129'  ra=16h51m03.662382s  dec= 01d29'23.45878"  qual=999  calib='V'
tape=(1,STOP) write=(1,off)
stop=17h59m50s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=18h01m20s   !NEXT!

!* --- Scan from 18h02m00s to 18h12m05s   Thu, 2004 Oct 21 --- *!
sname='B1642-03'  ra=16h45m02.044790s  dec=-03d17'58.35290"  qual=999  calib='G'
tape=(1,STOP) write=(1,off)
stop=18h02m00s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=18h12m05s   !NEXT!

!* --- Scan from 18h12m45s to 18h14m15s   Thu, 2004 Oct 21 --- *!
sname='J1651+0129'  ra=16h51m03.662382s  dec= 01d29'23.45878"  qual=999  calib='V'
tape=(1,STOP) write=(1,off)
stop=18h12m45s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=18h14m15s   !NEXT!

!* --- Scan from 18h14m55s to 18h25m00s   Thu, 2004 Oct 21 --- *!
sname='B1642-03'  ra=16h45m02.044790s  dec=-03d17'58.35290"  qual=999  calib='G'
tape=(1,STOP) write=(1,off)
stop=18h14m55s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=18h25m00s   !NEXT!

!* --- Scan from 18h25m40s to 18h27m10s   Thu, 2004 Oct 21 --- *!
sname='J1651+0129'  ra=16h51m03.662382s  dec= 01d29'23.45878"  qual=999  calib='V'
tape=(1,STOP) write=(1,off)
stop=18h25m40s   !NEXT!        
qual=  0
tape=(1,+RUN)  write=(1,on)
stop=18h27m10s   !NEXT!

tape=(1,STOP)    write=(1,off)   dur=0s 
stop=18h27m15s   !NEXT!
     !QUIT! 
