  COVER INFORMATION 

 Station:    VLBA_FD   (Code Fd ) 
 Experiment: Probing the innermost regions of AGN jets and their magnetic fields
 Exp. Code:  ga030c  


Schedule Version:       1.00
Processed by SCHED version:  11.10  Version 11.1 Beta of about April 26, 201

PI:       Andrei Lobanov

Address:  MPIfR Bonn
          Auf dem Huegel 69
          53121 Bonn, Germany
 

Phone:    +49 (228) 525 191
EMAIL:    alobanov@mpifr-bonn.mpg.de
Fax:      +49 228 525 229
Phone during observation: +7 903 661 48 65

Observing mode: K-band, dual-pol

Notes:    K-band, Radioastron-compatible frequency setup
          P-CAL is ON
          Tsys is ON, auto-level (AGC) is ON
          Please, send Mk5 disk packs to MPIfR-Bonn

Schedule for VLBA_FD   (Code Fd )                                   Page   2
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 ---------- BLOCK #14a: K/U/Q-band VLBA scans. Ground segment 7 ----------

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00
 Next scan bandwidths:      16.00     16.00     16.00     16.00

03 30 00  0954+658     04 28 02  30.5  28.5 -5.5     -82.3     0        0   03 30 00
03 34 30  ---          04 32 33  31.0  28.6 -5.5     -83.3   270        9   03 30 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

03 35 00  0954+658     04 33 03  31.0  28.6 -5.4     -83.4    15        9   03 35 00
03 39 30  ---          04 37 34  31.5  28.7 -5.4     -84.4   270       17   03 35 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

03 40 00  0954+658     04 38 04  31.5  28.7 -5.4     -84.5    15       17   03 40 00
03 44 30  ---          04 42 35  32.0  28.7 -5.3     -85.5   270       26   03 40 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

03 45 00  0954+658     04 43 05  32.0  28.7 -5.3     -85.6    24       26   03 45 00
03 49 30  ---          04 47 35  32.5  28.8 -5.2     -86.6   270       35   03 45 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

03 50 00  0954+658     04 48 05  32.6  28.8 -5.2     -86.7    24       35   03 50 00
03 54 30  ---          04 52 36  33.0  28.8 -5.1     -87.8   270       43   03 50 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

03 55 00  0954+658     04 53 06  33.1  28.8 -5.1     -87.9    24       43   03 55 00
03 59 30  ---          04 57 37  33.5  28.8 -5.0     -88.9   270       52   03 55 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

04 00 00  0954+658     04 58 07  33.6  28.8 -5.0     -89.0    24       52   04 00 00
04 04 30  ---          05 02 38  34.1  28.8 -5.0     -90.0   270       61   04 00 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

04 05 00  0954+658     05 03 08  34.1  28.8 -4.9     -90.1    24       61   04 05 00
04 09 30  ---          05 07 39  34.6  28.8 -4.9     -91.2   270       69   04 05 01
Schedule for VLBA_FD   (Code Fd )                                   Page   3
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

04 10 00  0954+658     05 08 09  34.6  28.8 -4.9     -91.3    24       69   04 10 00
04 14 30  ---          05 12 39  35.1  28.8 -4.8     -92.3   270       78   04 10 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

04 15 00  0954+658     05 13 10  35.2  28.8 -4.8     -92.4    24       78   04 15 00
04 19 30  ---          05 17 40  35.6  28.8 -4.7     -93.5   270       87   04 15 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

04 20 00  0954+658     05 18 10  35.7  28.8 -4.7     -93.6    24       87   04 20 00
04 24 30  ---          05 22 41  36.1  28.7 -4.6     -94.6   270       95   04 20 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

04 25 00  0954+658     05 23 11  36.2  28.7 -4.6     -94.8    24       95   04 25 00
04 29 30  ---          05 27 42  36.7  28.7 -4.5     -95.8   270      104   04 25 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

04 30 00  0954+658     05 28 12  36.7  28.7 -4.5     -95.9    24      104   04 30 00
04 34 30  ---          05 32 43  37.2  28.6 -4.5     -97.0   270      112   04 30 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

04 35 00  0954+658     05 33 13  37.2  28.6 -4.4     -97.1    24      112   04 35 00
04 39 30  ---          05 37 44  37.7  28.5 -4.4     -98.2   270      121   04 35 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

04 40 00  0954+658     05 38 14  37.7  28.5 -4.4     -98.3    24      121   04 40 00
04 44 30  ---          05 42 44  38.2  28.4 -4.3     -99.4   270      130   04 40 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

04 45 00  0954+658     05 43 14  38.3  28.4 -4.3     -99.5    24      130   04 45 00
04 49 30  ---          05 47 45  38.7  28.3 -4.2    -100.6   270      138   04 45 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

04 50 00  0954+658     05 48 15  38.8  28.3 -4.2    -100.7    24      138   04 50 00
04 54 30  ---          05 52 46  39.2  28.2 -4.1    -101.8   270      147   04 50 01
Schedule for VLBA_FD   (Code Fd )                                   Page   4
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

04 55 00  0954+658     05 53 16  39.3  28.1 -4.1    -102.0    24      147   04 55 00
04 59 30  ---          05 57 47  39.7  28.0 -4.0    -103.1   270      156   04 55 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

05 00 00  0954+658     05 58 17  39.8  28.0 -4.0    -103.2    24      156   05 00 00
05 04 30  ---          06 02 48  40.2  27.8 -4.0    -104.3   270      164   05 00 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

05 05 00  0954+658     06 03 18  40.3  27.8 -3.9    -104.4    24      164   05 05 00
05 09 30  ---          06 07 49  40.7  27.7 -3.9    -105.6   270      173   05 05 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

05 10 00  0954+658     06 08 19  40.8  27.7 -3.9    -105.7    24      173   05 10 00
05 14 30  ---          06 12 49  41.2  27.5 -3.8    -106.8   270      182   05 10 01

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

05 15 00  0954+658     06 13 19  41.3  27.5 -3.8    -107.0    24      182   05 15 00
05 19 30  ---          06 17 50  41.7  27.3 -3.7    -108.1   270      190   05 15 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

05 20 00  0954+658     06 18 20  41.8  27.3 -3.7    -108.2    24      190   05 20 00
05 23 00  ---          06 21 21  42.1  27.1 -3.6    -109.0   180      196   05 20 01

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

05 23 30  0954+658     06 21 51  42.1  27.1 -3.6    -109.1    24      196   05 23 30
05 27 00  ---          06 25 21  42.5  26.9 -3.6    -110.0   210      203   05 23 31

 ---------- BLOCK #15a: K/U/Q-band VLBA scans. Ground segment 7 ----------

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

05 30 30  0954+658     06 28 52  42.8  26.8 -3.5    -111.0   204      203   05 30 30
05 35 00  ---          06 33 23  43.3  26.5 -3.4    -112.1   270      212   05 30 31
Schedule for VLBA_FD   (Code Fd )                                   Page   5
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

05 35 30  0954+658     06 33 53  43.3  26.5 -3.4    -112.3    24      212   05 35 30
05 40 00  ---          06 38 24  43.7  26.2 -3.4    -113.5   270      220   05 35 31

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

05 40 30  0954+658     06 38 54  43.8  26.2 -3.4    -113.6    24      220   05 40 30
05 45 00  ---          06 43 24  44.2  25.9 -3.3    -114.8   270      229   05 40 31

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

05 45 30  0954+658     06 43 54  44.3  25.9 -3.3    -115.0    24      229   05 45 30
05 50 00  ---          06 48 25  44.7  25.6 -3.2    -116.2   270      237   05 45 31

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

05 50 30  0954+658     06 48 55  44.7  25.6 -3.2    -116.3    24      237   05 50 30
05 54 00  ---          06 52 26  45.0  25.4 -3.1    -117.3   210      244   05 50 31

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

05 54 30  0954+658     06 52 56  45.1  25.3 -3.1    -117.4    24      244   05 54 30
05 57 30  ---          06 55 56  45.4  25.1 -3.1    -118.3   180      250   05 54 31

 ---------- BLOCK #16: K-band VLBI scans. Ground segment 8 ----------

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

06 00 30  1226+023     06 58 57   7.3  92.0 -5.5     -59.4    96      250   06 00 30
06 04 30  ---          07 02 58   8.1  92.5 -5.4     -59.3   240      258   06 00 31

06 06 00  1222+216     07 04 28  18.7  75.8 -5.4     -63.5    62      258   06 06 00
06 09 20  ---          07 07 48  19.4  76.2 -5.3     -63.7   200      264   06 06 01

06 10 50  1226+023     07 09 19   9.5  93.4 -5.3     -59.3    62      264   06 10 50
06 14 20  ---          07 12 49  10.2  93.8 -5.3     -59.2   210      271   06 10 51

06 15 50  1222+216     07 14 19  20.7  76.9 -5.2     -64.1    62      271   06 15 50
06 19 10  ---          07 17 40  21.4  77.2 -5.1     -64.2   200      277   06 15 51

06 20 40  1226+023     07 19 10  11.6  94.6 -5.2     -59.1    62      277   06 20 40
06 24 10  ---          07 22 41  12.4  95.1 -5.1     -59.0   210      284   06 20 41
Schedule for VLBA_FD   (Code Fd )                                   Page   6
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

06 25 40  1222+216     07 24 11  22.8  77.9 -5.0     -64.6    62      284   06 25 40
06 29 00  ---          07 27 32  23.5  78.3 -5.0     -64.7   200      290   06 25 41

06 30 30  1226+023     07 29 02  13.7  95.9 -5.0     -58.9    62      290   06 30 30
06 34 00  ---          07 32 32  14.5  96.4 -5.0     -58.8   210      297   06 30 31

06 35 30  1222+216     07 34 03  24.9  79.0 -4.9     -65.0    62      297   06 35 30
06 38 50  ---          07 37 23  25.6  79.4 -4.8     -65.2   200      304   06 35 31

06 40 20  1226+023     07 38 53  15.8  97.3 -4.8     -58.7    62      304   06 40 20
06 43 50  ---          07 42 24  16.6  97.7 -4.8     -58.6   210      310   06 40 21

06 45 20  1222+216     07 43 54  27.0  80.1 -4.7     -65.5    62      310   06 45 20
06 48 40  ---          07 47 15  27.7  80.4 -4.6     -65.6   200      317   06 45 21

06 50 10  1226+023     07 48 45  17.9  98.6 -4.7     -58.3    62      317   06 50 10
06 53 40  ---          07 52 16  18.7  99.1 -4.6     -58.2   210      323   06 50 11

06 55 10  1222+216     07 53 46  29.1  81.2 -4.5     -65.9    62      323   06 55 10
06 58 30  ---          07 57 06  29.8  81.5 -4.5     -66.0   200      330   06 55 11

07 00 00  1226+023     07 58 37  20.0 100.0 -4.5     -58.0    62      330   07 00 00
07 03 30  ---          08 02 07  20.8 100.5 -4.5     -57.8   210      337   07 00 01

07 05 00  1222+216     08 03 37  31.2  82.2 -4.4     -66.2    62      337   07 05 00
07 08 30  ---          08 07 08  31.9  82.6 -4.3     -66.3   210      343   07 05 01

 ---------- BLOCK #17: K-band VLBI scans. Space segment 9 ----------

07 10 00  1226+023     08 08 38  22.1 101.4 -4.4     -57.6    62      343   07 10 00
07 19 30  ---          08 18 10  24.1 102.8 -4.2     -57.1   570      362   07 10 01

07 20 00  1226+023     08 18 40  24.2 102.9 -4.2     -57.1    24      362   07 20 00
07 29 30  ---          08 28 12  26.2 104.3 -4.0     -56.5   570      380   07 20 01

07 30 00  1226+023     08 28 42  26.3 104.4 -4.0     -56.5    24      380   07 30 00
07 39 30  ---          08 38 13  28.3 105.9 -3.9     -55.9   570      398   07 30 01

07 40 00  1226+023     08 38 43  28.4 106.0 -3.9     -55.9    24      398   07 40 00
07 49 30  ---          08 48 15  30.4 107.5 -3.7     -55.2   570      416   07 40 01

07 50 00  1226+023     08 48 45  30.5 107.6 -3.7     -55.2    24      416   07 50 00
08 00 00  ---          08 58 47  32.5 109.3 -3.5     -54.4   600      436   07 50 01
Schedule for VLBA_FD   (Code Fd )                                   Page   7
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 ---------- BLOCK #18a: K/U/Q-band VLBA scans. Ground segment 9 ----------

08 00 30  1226+023     08 59 17  32.6 109.4 -3.5     -54.3    24      436   08 00 30
08 05 00  ---          09 03 47  33.6 110.2 -3.4     -53.9   270      444   08 00 31

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

08 05 30  1226+023     09 04 17  33.7 110.3 -3.4     -53.9    24      444   08 05 30
08 10 00  ---          09 08 48  34.6 111.1 -3.4     -53.5   270      453   08 05 31

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

08 10 30  1226+023     09 09 18  34.7 111.2 -3.3     -53.4    24      453   08 10 30
08 15 00  ---          09 13 49  35.6 112.0 -3.3     -53.0   270      462   08 10 31

08 16 00  1222+216     09 14 49  46.4  90.6 -3.2     -67.4    31      462   08 16 00
08 20 00  ---          09 18 50  47.3  91.1 -3.1     -67.4   240      469   08 16 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

08 20 30  1222+216     09 19 20  47.4  91.2 -3.1     -67.4    24      469   08 20 30
08 25 00  ---          09 23 51  48.4  91.8 -3.0     -67.4   270      478   08 20 31

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

08 25 30  1222+216     09 24 21  48.5  91.8 -3.0     -67.4    24      478   08 25 30
08 30 00  ---          09 28 51  49.5  92.5 -2.9     -67.3   270      487   08 25 31

08 31 00  1226+023     09 29 52  38.7 115.1 -3.0     -51.2    31      487   08 31 00
08 35 00  ---          09 33 52  39.5 115.9 -2.9     -50.8   240      494   08 31 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

08 35 30  1226+023     09 34 22  39.6 116.0 -2.9     -50.7    24      494   08 35 30
08 40 00  ---          09 38 53  40.5 116.9 -2.8     -50.1   270      503   08 35 31

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

08 40 30  1226+023     09 39 23  40.6 117.0 -2.8     -50.1    24      503   08 40 30
08 45 00  ---          09 43 54  41.4 118.0 -2.8     -49.5   270      512   08 40 31

08 46 00  1222+216     09 44 54  52.9  94.8 -2.7     -67.0    30      512   08 46 00
08 50 00  ---          09 48 55  53.8  95.4 -2.6     -66.8   240      519   08 46 01
Schedule for VLBA_FD   (Code Fd )                                   Page   8
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

08 50 30  1222+216     09 49 25  53.9  95.5 -2.6     -66.8    24      519   08 50 30
08 55 00  ---          09 53 56  54.8  96.2 -2.5     -66.7   270      528   08 50 31

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

08 55 30  1222+216     09 54 26  54.9  96.3 -2.5     -66.6    24      528   08 55 30
09 00 00  ---          09 58 56  55.9  97.0 -2.4     -66.4   270      537   08 55 31

09 01 00  1226+023     09 59 57  44.4 121.6 -2.5     -47.1    29      537   09 01 00
09 05 00  ---          10 03 57  45.2 122.6 -2.4     -46.5   240      544   09 01 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

09 05 30  1226+023     10 04 27  45.2 122.7 -2.4     -46.4    24      544   09 05 30
09 10 00  ---          10 08 58  46.1 123.8 -2.3     -45.7   270      553   09 05 31

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

09 10 30  1226+023     10 09 28  46.1 124.0 -2.3     -45.6    24      553   09 10 30
09 15 00  ---          10 13 59  46.9 125.1 -2.3     -44.8   270      562   09 10 31

09 16 00  1222+216     10 14 59  59.3  99.8 -2.2     -65.5    28      562   09 16 00
09 20 00  ---          10 19 00  60.2 100.6 -2.1     -65.2   240      569   09 16 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

09 20 30  1222+216     10 19 30  60.3 100.7 -2.1     -65.2    24      569   09 20 30
09 25 00  ---          10 24 00  61.2 101.6 -2.0     -64.8   270      578   09 20 31

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

09 25 30  1222+216     10 24 31  61.3 101.7 -2.0     -64.7    24      578   09 25 30
09 30 00  ---          10 29 01  62.3 102.7 -1.9     -64.3   270      587   09 25 31

09 31 00  1226+023     10 30 01  49.7 129.5 -2.0     -41.6    27      587   09 31 00
09 35 00  ---          10 34 02  50.4 130.7 -1.9     -40.8   240      594   09 31 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

09 35 30  1226+023     10 34 32  50.4 130.8 -1.9     -40.6    24      594   09 35 30
09 40 00  ---          10 39 03  51.2 132.2 -1.8     -39.6   270      603   09 35 31
Schedule for VLBA_FD   (Code Fd )                                   Page   9
               Probing the innermost regions of AGN jets and their magnetic fields
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Sun  19 Jan 2014   Day  19 ---

 Next scan frequencies:  43120.00  43120.00  43136.00  43136.00
 Next BBC frequencies:     720.00    720.00    736.00    736.00

09 40 30  1226+023     10 39 33  51.2 132.4 -1.8     -39.5    24      603   09 40 30
09 45 00  ---          10 44 04  51.9 133.8 -1.8     -38.4   270      612   09 40 31

09 46 00  1222+216     10 45 04  65.6 106.5 -1.7     -62.3    25      612   09 46 00
09 50 00  ---          10 49 05  66.4 107.6 -1.6     -61.7   240      619   09 46 01

 Next scan frequencies:  15369.00  15369.00  15369.00  15369.00
 Next BBC frequencies:     769.00    769.00    769.00    769.00

09 50 30  1222+216     10 49 35  66.5 107.7 -1.6     -61.6    24      619   09 50 30
09 55 00  ---          10 54 05  67.5 109.0 -1.5     -60.8   270      628   09 50 31

 Next scan frequencies:  22236.00  22236.00  22236.00  22236.00
 Next BBC frequencies:     736.00    736.00    736.00    736.00

09 55 30  1222+216     10 54 35  67.6 109.2 -1.5     -60.7    24      628   09 55 30
10 00 00  ---          10 59 06  68.5 110.6 -1.4     -59.8   270      637   09 55 31


SETUP FILE INFORMATION:
   NOTE: If DOPPLER, FREQ, or BW were used, see the individual scans for the final BBC settings.


 ======== Setup file: ra1cm2.set
   Matching groups in ./ga030c_freq_sess313rdbe.dat:
     v1cm_b3

   Setup group:    5         Station: VLBA_FD           Total bit rate:   256
   Format: MARK5B            Bits per sample: 2         Sample rate: 32.000
   Number of channels:  4    DBE type: RDBE_DDC         Speedup factor:   1.00

   Disk used to record data.

   1st LO=  21500.00  21500.00  21500.00  21500.00
   Net SB=         L         L         U         U
   IF SB =         U         U         U         U
   Pol.  =      RCP       LCP       RCP       LCP 
   BBC   =         1         2         3         4
   BBC SB=         L         L         U         U
   IF    =        B         D         B         D 

   VLBA FE=     omit     1cm      omit     1cm 
   VLBA Synth=   9.1     15.1     12.4

  The following frequency sets based on these setups were used.

   Frequency Set:  14  Setup file default.
   LO sum=   22236.00  22236.00  22236.00  22236.00
   BBC fr=     736.00    736.00    736.00    736.00
   Bandwd=      16.00     16.00     16.00     16.00
    Matching frequency sets:  14  15  20  21  22  23  24  25  26  27

   Track assignments are: 
    track1=   2,  4,  6,  8
    barrel=roll_off 


 ======== Setup file: ra2cm2.set
   Matching groups in ./ga030c_freq_sess313rdbe.dat:
     v2cm_d3         Fourth 2cm filter

   Setup group:   31         Station: VLBA_FD           Total bit rate:   256
   Format: MARK5B            Bits per sample: 2         Sample rate: 32.000
   Number of channels:  4    DBE type: RDBE_DDC         Speedup factor:   1.00

   Disk used to record data.

   1st LO=  14600.00  14600.00  14600.00  14600.00
   Net SB=         L         L         U         U
   IF SB =         U         U         U         U
   Pol.  =      RCP       LCP       RCP       LCP 
   BBC   =         1         2         3         4
   BBC SB=         L         L         U         U
   IF    =        B         D         B         D 

   VLBA FE=     omit     2cm      omit     2cm 
   VLBA Synth=  14.6     11.4     11.4

  The following frequency sets based on these setups were used.

   Frequency Set:  28  Setup file default.
   LO sum=   15369.00  15369.00  15369.00  15369.00
   BBC fr=     769.00    769.00    769.00    769.00
   Bandwd=      16.00     16.00     16.00     16.00
    Matching frequency sets:  28  29  30  31  32  33  34  35  44  45

   Track assignments are: 
    track1=   2,  4,  6,  8
    barrel=roll_off 


 ======== Setup file: ra7mm2.set
   Matching groups in ./ga030c_freq_sess313rdbe.dat:
     v7mm_c8

   Setup group:   41         Station: VLBA_FD           Total bit rate:   256
   Format: MARK5B            Bits per sample: 2         Sample rate: 32.000
   Number of channels:  4    DBE type: RDBE_DDC         Speedup factor:   1.00

   Disk used to record data.

   1st LO=  42400.00  42400.00  42400.00  42400.00
   Net SB=         U         U         U         U
   IF SB =         U         U         U         U
   Pol.  =      RCP       LCP       RCP       LCP 
   BBC   =         1         2         3         4
   BBC SB=         U         U         U         U
   IF    =        A         C         A         C 

   VLBA FE=     7mm      omit     7mm      omit
   VLBA Synth=  15.1      7.6     11.6

  The following frequency sets based on these setups were used.

   Frequency Set:  36  Setup file default.
   LO sum=   43120.00  43120.00  43136.00  43136.00
   BBC fr=     720.00    720.00    736.00    736.00
   Bandwd=      16.00     16.00     16.00     16.00
    Matching frequency sets:  36  37  38  39  40  41  42  43  46  47

   Track assignments are: 
    track1=   2,  4,  6,  8
    barrel=roll_off 

 POSITIONS OF SOURCES USED IN RECORDING SCANS

   Source                         Source position (RA/Dec)                        Error
                        (B1950)             (J2000)             (Date)            (mas)

 * FAKERA            11 57 21.769299   * 12 00 00.000000     12 00 44.282693       0.00
                     85 16 41.77889    * 85 00 00.00000      84 54 55.50913        0.00
                     From catalog imbedded in main SCHED input file.
                     fake circumpolar target for the TS to look at

 * 0954+658          09 54 57.847936   * 09 58 47.245116     09 59 53.875760       0.00
   J0958+6533        65 48 15.53882    * 65 33 54.81801      65 29 31.69862        0.00
                     ./ga030c_sources.radioastron
                     AGN, rfc_2013d Petrov, 2013, unpublished 13350 observations

 * 1156+295          11 56 57.786212   * 11 59 31.833913     12 00 16.095129       0.00
   J1159+2914        29 31 25.73868    * 29 14 43.82678      29 09 45.58505        0.00
                     ./ga030c_sources.radioastron
                     AGN, rfc_2013d Petrov, 2013, unpublished 70591 observations

 * 1222+216          12 22 23.408709   * 12 24 54.458394     12 25 37.794604       0.00
   J1224+2122        21 39 23.03696    * 21 22 46.38857      21 17 52.49139        0.00
                     ./ga030c_sources.radioastron
                     AGN, rfc_2013d Petrov, 2013, unpublished 406 observations

 * 1226+023          12 26 33.245835   * 12 29 06.699731     12 29 50.900697       0.00
   J1229+0203        02 19 43.30547    * 02 03 08.59797      01 58 21.52226        0.00
   3C273B            ./ga030c_sources.radioastron
   3C273             AGN, rfc_2013d Petrov, 2013, unpublished 32011 observations

 * 1253-055          12 53 35.831289   * 12 56 11.166557     12 56 55.846230       0.00
   J1256-0547       -05 31 07.99603    *-05 47 21.52489     -05 51 58.64428        0.00
   3C279             ./ga030c_sources.radioastron
                     AGN, rfc_2013d Petrov, 2013, unpublished 7924 observations



SOURCE SCAN SUMMARY FOR SOURCES LISTED ABOVE

     Scan hours are for recording scans only. 
     Baseline hours are only counted for scans above horizon at both ends.
  Source       Setup file             Frequency sets                  Observing hours
                                   (duplicates not shown)              Scan  Baseline
  FAKERA     ra1cm2.set            5                                 4.667     0.000
  0954+658   ra1cm2.set            14                                1.125    19.650
             ra2cm2.set            28                                1.008    18.475
             ra7mm2.set            36                                1.058    19.258
  1156+295   ra1cm2.set            8 9 10 11 12 13                   0.450     6.744
  1222+216   ra1cm2.set            7 8 9 10 11 12 13 14 17 18        1.933   104.820
             ra2cm2.set            28                                0.300    12.825
             ra7mm2.set            36                                0.267    11.175
  1226+023   ra1cm2.set            1 2 3 4 5 7 8 9 10 11 12 13 +     8.792   383.389
             ra2cm2.set            28                                0.300    12.150
             ra7mm2.set            36                                0.300    12.150
  1253-055   ra1cm2.set            1 2 3 4 7 8 9 10 11 12 13 1 +     2.450    31.183


EFFECT OF SOLAR CORONA

  The solar corona can cause unstable phases for sources too close to the Sun.
  SCHED provides warnings at individual scans for distances less than 10 degrees.
  The distance from the Sun to each source in this schedule is:
    Source         Sun distance (deg) 
   FAKERA             112.9
   0954+658           131.1
   1156+295           126.2
   1222+216           119.4
   1226+023           112.8
   1253-055           103.5

  Barry Clark estimates from predictions by Ketan Desai of IPM scattering sizes 
  that the Sun will cause amplitude reductions on the  longest VLBA baselines 
  at a solar distance of 60deg F^(-0.6) where F is in GHz. 
  For common VLBI bands, this is: 
       327 MHz        117. deg 
       610 MHz         81. deg 
       1.6 GHz         45. deg 
       2.3 GHz         36. deg 
       5.0 GHz         23. deg 
       8.4 GHz         17. deg 
      15.0 GHz         12. deg 
      22.0 GHz          9. deg 
      43.0 GHz          6. deg 

