  COVER INFORMATION 

 Station:    VLBA_FD   (Code Fd ) 
 Experiment: Confirming the detection of a dark matter substructure with Global VLBI
 Exp. Code:  gs038b  


Schedule Version:       4.00
Processed by SCHED version:  11.40  Release 11.4.  March 14, 2015

PI:       Cristiana Spingola

Address:  University of Groningen - Kapteyn Astronomical Institute
          Landleven 12
          9747AD Groningen
          the Netherlands

Phone:    +31 633380186
EMAIL:    spingola@astro.rug.nl
Fax:
Phone during observation:

Observing mode: 18cm 1024-8-2

Notes:
 
 
 

Schedule for VLBA_FD   (Code Fd )                                   Page   2
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

 Next scan frequencies:  1504.25  1504.25  1568.25  1568.25  1632.25  1632.25  1696.25  1696.25
 Next BBC frequencies:    895.75   895.75   831.75   831.75   767.75   767.75   703.75   703.75
 Next scan bandwidths:     64.00    64.00    64.00    64.00    64.00    64.00    64.00    64.00

03 30 30  B0712+472    23 14 12   4.2  35.9 -8.1     -47.8     0        0   03 30 30
03 34 00  ---          23 17 43   4.7  36.3 -8.0     -48.5   210       54   03 30 31

03 34 00  J0720+473    23 17 43   4.5  35.5 -8.1     -47.7    -8       54   03 34 08
03 36 00  ---          23 19 43   4.7  35.7 -8.0     -48.1   112       83   03 34 01

03 36 00  B0712+472    23 19 43   4.9  36.5 -8.0     -48.8    -8       83   03 36 08
03 40 00  ---          23 23 44   5.4  37.0 -7.9     -49.5   232      143   03 36 01

03 40 00  J0720+473    23 23 44   5.2  36.1 -8.0     -48.8    -8      143   03 40 08
03 42 00  ---          23 25 44   5.5  36.4 -7.9     -49.1   112      172   03 40 01

03 42 30  B0712+472    23 26 14   5.8  37.2 -7.9     -49.9    22      172   03 42 30
03 46 00  ---          23 29 45   6.2  37.6 -7.8     -50.5   210      226   03 42 31

03 46 00  J0720+473    23 29 45   6.0  36.8 -7.9     -49.8    -8      226   03 46 08
03 48 00  ---          23 31 45   6.2  37.0 -7.8     -50.2   112      255   03 46 01

03 48 00  B0712+472    23 31 45   6.5  37.9 -7.8     -50.9    -8      255   03 48 08
03 52 00  ---          23 35 46   7.0  38.3 -7.7     -51.6   232      314   03 48 01

03 52 00  J0720+473    23 35 46   6.8  37.4 -7.8     -50.9    -8      314   03 52 08
03 54 00  ---          23 37 46   7.0  37.7 -7.7     -51.2   112      343   03 52 01

03 54 30  B0712+472    23 38 16   7.4  38.5 -7.7     -52.0    22      343   03 54 30
03 58 00  ---          23 41 47   7.8  38.9 -7.6     -52.6   210      397   03 54 31

03 58 00  J0720+473    23 41 47   7.6  38.1 -7.7     -51.9    -8      397   03 58 08
04 00 00  ---          23 43 47   7.8  38.3 -7.6     -52.2   112      426   03 58 01

04 00 00  B0712+472    23 43 47   8.1  39.1 -7.6     -52.9    -8      426   04 00 08
04 04 00  ---          23 47 48   8.7  39.5 -7.5     -53.6   232      486   04 00 01

04 04 00  J0720+473    23 47 48   8.4  38.7 -7.6     -52.9    -8      486   04 04 08
04 06 00  ---          23 49 48   8.6  38.9 -7.5     -53.3   112      515   04 04 01

04 06 30  B0712+472    23 50 18   9.0  39.8 -7.4     -54.0    22      515   04 06 30
04 10 00  ---          23 53 49   9.5  40.1 -7.4     -54.6   210      569   04 06 31

04 10 00  J0720+473    23 53 49   9.2  39.3 -7.5     -53.9    -8      569   04 10 08
04 12 00  ---          23 55 49   9.4  39.5 -7.4     -54.3   112      598   04 10 01
Schedule for VLBA_FD   (Code Fd )                                   Page   3
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

04 12 00  B0712+472    23 55 49   9.8  40.3 -7.4     -54.9    -8      598   04 12 08
04 16 00  ---          23 59 50  10.3  40.7 -7.3     -55.6   232      657   04 12 01

04 16 00  J0720+473    23 59 50  10.0  39.9 -7.4     -55.0    -8      657   04 16 08
04 18 00  ---          00 01 50  10.3  40.1 -7.3     -55.3   112      686   04 16 01

04 18 30  B0712+472    00 02 20  10.7  41.0 -7.2     -56.0    22      686   04 18 30
04 22 00  ---          00 05 51  11.2  41.3 -7.2     -56.6   210      740   04 18 31

04 22 00  J0720+473    00 05 51  10.8  40.5 -7.3     -56.0    -8      740   04 22 08
04 24 00  ---          00 07 51  11.1  40.7 -7.2     -56.3   112      769   04 22 01

04 24 00  B0712+472    00 07 51  11.5  41.5 -7.2     -56.9    -8      769   04 24 08
04 28 00  ---          00 11 52  12.0  41.9 -7.1     -57.6   232      829   04 24 01

04 28 00  J0720+473    00 11 52  11.7  41.1 -7.2     -57.0    -8      829   04 28 08
04 30 00  ---          00 13 52  12.0  41.3 -7.1     -57.3   112      858   04 28 01

04 30 30  B0712+472    00 14 22  12.4  42.1 -7.0     -58.0    22      858   04 30 30
04 34 00  ---          00 17 53  12.9  42.4 -7.0     -58.6   210      912   04 30 31

04 34 00  J0720+473    00 17 53  12.5  41.6 -7.1     -57.9    -8      912   04 34 08
04 36 00  ---          00 19 53  12.8  41.8 -7.0     -58.3   112      941   04 34 01

04 36 00  B0712+472    00 19 53  13.2  42.6 -7.0     -58.9    -8      941   04 36 08
04 40 00  ---          00 23 54  13.8  43.0 -6.9     -59.5   232     1001   04 36 01

04 40 00  J0720+473    00 23 54  13.4  42.2 -7.0     -58.9    -8     1001   04 40 08
04 42 00  ---          00 25 54  13.7  42.4 -6.9     -59.3   112     1030   04 40 01

04 42 30  B0712+472    00 26 24  14.1  43.2 -6.8     -59.9    21     1030   04 42 30
04 46 00  ---          00 29 55  14.7  43.5 -6.8     -60.5   210     1084   04 42 31

04 46 00  J0720+473    00 29 55  14.3  42.7 -6.9     -59.9    -8     1084   04 46 08
04 48 00  ---          00 31 55  14.6  42.9 -6.8     -60.2   112     1112   04 46 01

04 48 00  B0712+472    00 31 55  15.0  43.7 -6.8     -60.8    -9     1112   04 48 09
04 52 00  ---          00 35 56  15.6  44.0 -6.7     -61.5   231     1172   04 48 01

04 52 00  J0720+473    00 35 56  15.2  43.2 -6.8     -60.9    -9     1172   04 52 09
04 54 00  ---          00 37 56  15.4  43.4 -6.7     -61.2   111     1201   04 52 01

04 54 30  B0712+472    00 38 26  15.9  44.2 -6.6     -61.9    21     1201   04 54 30
04 58 00  ---          00 41 57  16.5  44.5 -6.6     -62.4   210     1255   04 54 31
Schedule for VLBA_FD   (Code Fd )                                   Page   4
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

04 58 00  J0720+473    00 41 57  16.0  43.7 -6.7     -61.9    -9     1255   04 58 09
05 00 00  ---          00 43 57  16.3  43.9 -6.6     -62.2   111     1283   04 58 01

05 00 00  B0712+472    00 43 57  16.8  44.7 -6.6     -62.8    -9     1283   05 00 09
05 04 00  ---          00 47 58  17.4  45.0 -6.5     -63.4   231     1343   05 00 01

05 04 00  J0720+473    00 47 58  16.9  44.2 -6.6     -62.8    -9     1343   05 04 09
05 06 00  ---          00 49 58  17.2  44.4 -6.5     -63.2   111     1371   05 04 01

05 06 30  B0712+472    00 50 28  17.8  45.2 -6.4     -63.8    21     1371   05 06 30
05 10 00  ---          00 53 59  18.3  45.5 -6.4     -64.4   210     1426   05 06 31

05 10 00  J0720+473    00 53 59  17.8  44.7 -6.5     -63.8    -9     1426   05 10 09
05 12 00  ---          00 55 59  18.2  44.9 -6.4     -64.1   111     1454   05 10 01

05 12 00  B0712+472    00 55 59  18.6  45.6 -6.4     -64.7    -9     1454   05 12 09
05 16 00  ---          01 00 00  19.2  45.9 -6.3     -65.3   231     1514   05 12 01

05 16 00  J0720+473    01 00 00  18.8  45.2 -6.4     -64.8    -9     1514   05 16 09
05 18 00  ---          01 02 00  19.1  45.3 -6.3     -65.1   111     1542   05 16 01

05 18 30  B0712+472    01 02 30  19.6  46.1 -6.2     -65.7    21     1542   05 18 30
05 22 00  ---          01 06 01  20.2  46.4 -6.2     -66.3   210     1596   05 18 31

05 22 00  J0720+473    01 06 01  19.7  45.6 -6.3     -65.7    -9     1596   05 22 09
05 24 00  ---          01 08 01  20.0  45.8 -6.2     -66.1   111     1625   05 22 01

05 24 00  B0712+472    01 08 01  20.5  46.5 -6.2     -66.6    -9     1625   05 24 09
05 28 00  ---          01 12 02  21.1  46.8 -6.1     -67.2   231     1684   05 24 01

05 28 00  J0720+473    01 12 02  20.6  46.0 -6.2     -66.7    -9     1684   05 28 09
05 30 00  ---          01 14 02  20.9  46.2 -6.1     -67.0   111     1713   05 28 01

05 31 40  DA193        01 15 42  33.3  59.9 -4.7     -75.8    68     1713   05 31 40
05 41 00  ---          01 25 04  35.1  60.4 -4.5     -77.0   560     1857   05 31 41

05 42 30  B0712+472    01 26 34  23.4  47.8 -5.8     -69.5    59     1857   05 42 30
05 46 00  ---          01 30 05  24.0  48.0 -5.8     -70.1   210     1911   05 42 31

05 46 00  J0720+473    01 30 05  23.4  47.3 -5.9     -69.6    -9     1911   05 46 09
05 48 00  ---          01 32 05  23.8  47.4 -5.8     -69.9   111     1940   05 46 01

05 48 00  B0712+472    01 32 05  24.3  48.2 -5.8     -70.4    -9     1940   05 48 09
05 52 00  ---          01 36 06  24.9  48.4 -5.7     -71.0   231     2000   05 48 01
Schedule for VLBA_FD   (Code Fd )                                   Page   5
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

05 52 00  J0720+473    01 36 06  24.4  47.6 -5.8     -70.5    -9     2000   05 52 09
05 54 00  ---          01 38 06  24.7  47.8 -5.7     -70.9   111     2028   05 52 01

05 54 30  B0712+472    01 38 36  25.3  48.6 -5.6     -71.4    21     2028   05 54 30
05 58 00  ---          01 42 07  25.9  48.8 -5.6     -72.0   210     2082   05 54 31

05 58 00  J0720+473    01 42 07  25.3  48.0 -5.7     -71.5    -9     2082   05 58 09
06 00 00  ---          01 44 07  25.7  48.1 -5.6     -71.8   111     2111   05 58 01

06 00 00  B0712+472    01 44 07  26.2  48.9 -5.6     -72.3    -9     2111   06 00 09
06 04 00  ---          01 48 08  26.9  49.1 -5.5     -72.9   231     2170   06 00 01

06 04 00  J0720+473    01 48 08  26.3  48.4 -5.6     -72.5    -9     2170   06 04 09
06 06 00  ---          01 50 08  26.6  48.5 -5.5     -72.8   111     2199   06 04 01

06 06 30  B0712+472    01 50 38  27.3  49.3 -5.4     -73.3    21     2199   06 06 30
06 10 00  ---          01 54 09  27.8  49.4 -5.4     -73.9   210     2253   06 06 31

06 10 00  J0720+473    01 54 09  27.3  48.7 -5.5     -73.4    -9     2253   06 10 09
06 12 00  ---          01 56 09  27.6  48.8 -5.4     -73.7   111     2282   06 10 01

06 12 00  B0712+472    01 56 09  28.2  49.5 -5.4     -74.2    -9     2282   06 12 09
06 16 00  ---          02 00 10  28.8  49.8 -5.3     -74.8   231     2341   06 12 01

06 16 00  J0720+473    02 00 10  28.3  49.0 -5.4     -74.4    -9     2341   06 16 09
06 18 00  ---          02 02 10  28.6  49.1 -5.3     -74.7   111     2370   06 16 01

06 18 30  B0712+472    02 02 40  29.2  49.9 -5.2     -75.2    21     2370   06 18 30
06 22 00  ---          02 06 11  29.8  50.1 -5.2     -75.8   210     2424   06 18 31

06 22 00  J0720+473    02 06 11  29.2  49.3 -5.3     -75.3    -9     2424   06 22 09
06 24 00  ---          02 08 11  29.6  49.4 -5.2     -75.7   111     2452   06 22 01

06 24 00  B0712+472    02 08 11  30.2  50.2 -5.2     -76.1    -9     2452   06 24 09
06 28 00  ---          02 12 12  30.8  50.3 -5.1     -76.7   231     2512   06 24 01

06 28 00  J0720+473    02 12 12  30.2  49.6 -5.2     -76.3    -9     2512   06 28 09
06 30 00  ---          02 14 12  30.5  49.7 -5.1     -76.6   111     2541   06 28 01

06 30 30  B0712+472    02 14 42  31.2  50.5 -5.0     -77.1    21     2541   06 30 30
06 34 00  ---          02 18 13  31.8  50.6 -5.0     -77.7   210     2595   06 30 31

06 34 00  J0720+473    02 18 13  31.2  49.9 -5.1     -77.3    -9     2595   06 34 09
06 36 00  ---          02 20 13  31.5  50.0 -5.0     -77.6   111     2623   06 34 01
Schedule for VLBA_FD   (Code Fd )                                   Page   6
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

06 36 00  B0712+472    02 20 13  32.1  50.7 -5.0     -78.0    -9     2623   06 36 09
06 40 00  ---          02 24 14  32.8  50.9 -4.9     -78.7   231     2683   06 36 01

06 40 00  J0720+473    02 24 14  32.2  50.1 -5.0     -78.3    -9     2683   06 40 09
06 42 00  ---          02 26 14  32.5  50.2 -4.9     -78.6   111     2711   06 40 01

06 42 30  B0712+472    02 26 44  33.2  50.9 -4.8     -79.1    21     2711   06 42 30
06 46 00  ---          02 30 15  33.8  51.1 -4.8     -79.6   210     2765   06 42 31

06 46 00  J0720+473    02 30 15  33.2  50.4 -4.9     -79.2    -9     2765   06 46 09
06 48 00  ---          02 32 15  33.5  50.4 -4.8     -79.6   111     2794   06 46 01

06 48 00  B0712+472    02 32 15  34.2  51.2 -4.8     -80.0    -9     2794   06 48 09
06 52 00  ---          02 36 16  34.8  51.3 -4.7     -80.6   231     2854   06 48 01

06 52 00  J0720+473    02 36 16  34.2  50.6 -4.8     -80.2    -9     2854   06 52 09
06 54 00  ---          02 38 16  34.5  50.6 -4.7     -80.6   111     2882   06 52 01

06 54 30  B0712+472    02 38 46  35.3  51.4 -4.6     -81.0    21     2882   06 54 30
06 58 00  ---          02 42 17  35.8  51.5 -4.6     -81.6   210     2936   06 54 31

06 58 00  J0720+473    02 42 17  35.2  50.8 -4.7     -81.2    -9     2936   06 58 09
07 00 00  ---          02 44 17  35.5  50.8 -4.6     -81.6   111     2965   06 58 01

07 00 00  B0712+472    02 44 17  36.2  51.5 -4.6     -81.9    -9     2965   07 00 09
07 04 00  ---          02 48 18  36.9  51.7 -4.5     -82.6   231     3024   07 00 01

07 04 00  J0720+473    02 48 18  36.2  51.0 -4.6     -82.2    -9     3024   07 04 09
07 06 00  ---          02 50 18  36.5  51.0 -4.5     -82.6   111     3053   07 04 01

07 06 30  B0712+472    02 50 48  37.3  51.7 -4.4     -83.0    21     3053   07 06 30
07 10 00  ---          02 54 19  37.9  51.8 -4.4     -83.6   210     3107   07 06 31

07 10 00  J0720+473    02 54 19  37.2  51.1 -4.5     -83.3    -9     3107   07 10 09
07 12 00  ---          02 56 19  37.5  51.2 -4.4     -83.6   111     3136   07 10 01

07 12 00  B0712+472    02 56 19  38.2  51.9 -4.3     -83.9    -9     3136   07 12 09
07 16 00  ---          03 00 20  38.9  52.0 -4.3     -84.6   231     3195   07 12 01

07 16 00  J0720+473    03 00 20  38.2  51.3 -4.4     -84.3    -9     3195   07 16 09
07 18 00  ---          03 02 20  38.5  51.3 -4.3     -84.6   111     3224   07 16 01

07 18 30  B0712+472    03 02 50  39.3  52.0 -4.2     -85.1    21     3224   07 18 30
07 22 00  ---          03 06 21  39.9  52.1 -4.2     -85.7   210     3278   07 18 31
Schedule for VLBA_FD   (Code Fd )                                   Page   7
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

07 22 00  J0720+473    03 06 21  39.2  51.4 -4.3     -85.3    -9     3278   07 22 09
07 24 00  ---          03 08 21  39.6  51.4 -4.2     -85.7   111     3307   07 22 01

07 24 00  B0712+472    03 08 21  40.2  52.1 -4.1     -86.0    -9     3307   07 24 09
07 28 00  ---          03 12 22  40.9  52.2 -4.1     -86.7   231     3366   07 24 01

07 28 00  J0720+473    03 12 22  40.2  51.5 -4.2     -86.4    -9     3366   07 28 09
07 30 00  ---          03 14 22  40.6  51.5 -4.1     -86.7   111     3395   07 28 01

07 30 30  B0712+472    03 14 52  41.4  52.2 -4.0     -87.1    21     3395   07 30 30
07 34 00  ---          03 18 22  42.0  52.2 -4.0     -87.8   210     3449   07 30 31

07 34 00  J0720+473    03 18 22  41.2  51.5 -4.1     -87.4    -9     3449   07 34 09
07 36 00  ---          03 20 23  41.6  51.6 -4.0     -87.8   111     3477   07 34 01

07 36 00  B0712+472    03 20 23  42.3  52.2 -3.9     -88.1    -9     3477   07 36 09
07 40 00  ---          03 24 23  43.0  52.3 -3.9     -88.8   231     3537   07 36 01

07 40 00  J0720+473    03 24 23  42.3  51.6 -4.0     -88.5    -9     3537   07 40 09
07 42 00  ---          03 26 24  42.6  51.6 -3.9     -88.9   111     3565   07 40 01

07 42 30  B0712+472    03 26 54  43.4  52.3 -3.8     -89.3    21     3565   07 42 30
07 46 00  ---          03 30 24  44.0  52.3 -3.8     -89.9   210     3620   07 42 31

07 46 00  J0720+473    03 30 24  43.3  51.6 -3.9     -89.6    -9     3620   07 46 09
07 48 00  ---          03 32 25  43.6  51.6 -3.8     -90.0   111     3648   07 46 01

07 48 00  B0712+472    03 32 25  44.3  52.3 -3.7     -90.3    -9     3648   07 48 09
07 52 00  ---          03 36 25  45.0  52.3 -3.7     -91.0   231     3708   07 48 01

07 52 00  J0720+473    03 36 25  44.3  51.6 -3.8     -90.7    -9     3708   07 52 09
07 54 00  ---          03 38 26  44.6  51.6 -3.7     -91.1   111     3736   07 52 01

07 54 30  B0712+472    03 38 56  45.4  52.2 -3.6     -91.5    21     3736   07 54 30
07 58 00  ---          03 42 26  46.0  52.2 -3.6     -92.2   210     3790   07 54 31

07 58 00  J0720+473    03 42 26  45.3  51.6 -3.7     -91.8    -9     3790   07 58 09
08 00 00  ---          03 44 27  45.6  51.6 -3.6     -92.2   111     3819   07 58 01

08 00 00  B0712+472    03 44 27  46.4  52.2 -3.5     -92.6    -9     3819   08 00 09
08 04 00  ---          03 48 27  47.1  52.2 -3.5     -93.3   231     3878   08 00 01

08 04 00  J0720+473    03 48 27  46.3  51.5 -3.6     -93.0    -9     3878   08 04 09
08 06 00  ---          03 50 28  46.7  51.5 -3.5     -93.4   111     3907   08 04 01
Schedule for VLBA_FD   (Code Fd )                                   Page   8
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

08 06 30  B0712+472    03 50 58  47.5  52.1 -3.4     -93.8    20     3907   08 06 30
08 10 00  ---          03 54 28  48.1  52.0 -3.4     -94.5   210     3961   08 06 31

08 10 00  J0720+473    03 54 28  47.3  51.4 -3.5     -94.2    -9     3961   08 10 09
08 12 00  ---          03 56 29  47.7  51.4 -3.4     -94.6   111     3990   08 10 01

08 12 00  B0712+472    03 56 29  48.4  52.0 -3.3     -94.9   -10     3990   08 12 10
08 16 00  ---          04 00 29  49.1  51.9 -3.3     -95.7   230     4049   08 12 01

08 16 00  J0720+473    04 00 29  48.3  51.3 -3.4     -95.4    -9     4049   08 16 09
08 18 00  ---          04 02 30  48.7  51.2 -3.3     -95.8   111     4078   08 16 01

08 18 30  B0712+472    04 03 00  49.5  51.8 -3.2     -96.2    20     4078   08 18 30
08 22 00  ---          04 06 30  50.1  51.7 -3.2     -96.9   210     4132   08 18 31

08 22 00  J0720+473    04 06 30  49.3  51.1 -3.3     -96.6   -10     4132   08 22 10
08 24 00  ---          04 08 31  49.7  51.1 -3.2     -97.0   110     4160   08 22 01

08 24 00  B0712+472    04 08 31  50.5  51.7 -3.1     -97.4   -10     4160   08 24 10
08 28 00  ---          04 12 31  51.1  51.5 -3.1     -98.2   230     4219   08 24 01

08 28 00  J0720+473    04 12 31  50.4  50.9 -3.2     -97.9   -10     4219   08 28 10
08 30 00  ---          04 14 32  50.7  50.9 -3.1     -98.3   110     4248   08 28 01

08 30 30  B0712+472    04 15 02  51.6  51.4 -3.0     -98.7    20     4248   08 30 30
08 34 00  ---          04 18 32  52.2  51.3 -3.0     -99.5   210     4302   08 30 31

08 34 00  J0720+473    04 18 32  51.4  50.7 -3.1     -99.2   -10     4302   08 34 10
08 36 00  ---          04 20 33  51.7  50.6 -3.0     -99.6   110     4330   08 34 01

08 36 00  B0712+472    04 20 33  52.5  51.2 -2.9    -100.0   -10     4330   08 36 10
08 40 00  ---          04 24 33  53.2  51.0 -2.9    -100.9   230     4389   08 36 01

08 40 00  J0720+473    04 24 33  52.4  50.4 -3.0    -100.5   -10     4389   08 40 10
08 42 00  ---          04 26 34  52.7  50.3 -2.9    -101.0   110     4418   08 40 01

08 44 00  4C39.25      04 28 34  29.7  59.8 -5.0     -72.9    66     4418   08 44 00
08 52 00  ---          04 36 35  31.2  60.3 -4.9     -73.9   480     4541   08 44 01

08 54 30  B0712+472    04 39 06  55.6  50.0 -2.6    -104.3    94     4541   08 54 30
08 58 00  ---          04 42 36  56.2  49.8 -2.6    -105.1   210     4595   08 54 31

08 58 00  J0720+473    04 42 36  55.3  49.3 -2.6    -104.7   -10     4595   08 58 10
09 00 00  ---          04 44 37  55.7  49.1 -2.6    -105.2   110     4624   08 58 01
Schedule for VLBA_FD   (Code Fd )                                   Page   9
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

09 00 00  B0712+472    04 44 37  56.5  49.6 -2.5    -105.6   -10     4624   09 00 10
09 04 00  ---          04 48 37  57.1  49.3 -2.5    -106.7   230     4683   09 00 01

09 04 00  J0720+473    04 48 37  56.3  48.8 -2.5    -106.3   -10     4683   09 04 10
09 06 00  ---          04 50 38  56.6  48.6 -2.5    -106.8   110     4711   09 04 01

09 06 30  B0712+472    04 51 08  57.5  49.0 -2.4    -107.3    20     4711   09 06 30
09 10 00  ---          04 54 38  58.1  48.7 -2.4    -108.2   210     4766   09 06 31

09 10 00  J0720+473    04 54 38  57.3  48.3 -2.4    -107.8   -10     4766   09 10 10
09 12 00  ---          04 56 39  57.6  48.1 -2.4    -108.4   110     4794   09 10 01

09 12 00  B0712+472    04 56 39  58.4  48.5 -2.3    -108.8   -10     4794   09 12 10
09 16 00  ---          05 00 39  59.1  48.1 -2.3    -109.9   230     4853   09 12 01

09 16 00  J0720+473    05 00 39  58.2  47.7 -2.3    -109.4   -10     4853   09 16 10
09 18 00  ---          05 02 40  58.6  47.4 -2.3    -110.0   110     4881   09 16 01

09 18 30  B0712+472    05 03 10  59.5  47.8 -2.2    -110.6    20     4881   09 18 30
09 22 00  ---          05 06 40  60.0  47.3 -2.2    -111.6   210     4936   09 18 31

09 22 00  J0720+473    05 06 40  59.2  47.0 -2.2    -111.1   -10     4936   09 22 10
09 24 00  ---          05 08 41  59.5  46.7 -2.2    -111.7   110     4964   09 22 01

09 24 00  B0712+472    05 08 41  60.4  47.1 -2.1    -112.2   -10     4964   09 24 10
09 28 00  ---          05 12 41  61.0  46.5 -2.1    -113.4   230     5023   09 24 01

09 28 00  J0720+473    05 12 41  60.1  46.2 -2.1    -112.9   -10     5023   09 28 10
09 30 00  ---          05 14 42  60.4  46.0 -2.1    -113.5   110     5052   09 28 01

09 30 30  B0712+472    05 15 12  61.4  46.2 -2.0    -114.2    20     5052   09 30 30
09 34 00  ---          05 18 42  61.9  45.7 -2.0    -115.3   210     5106   09 30 31

09 34 00  J0720+473    05 18 42  61.1  45.4 -2.0    -114.7   -10     5106   09 34 10
09 36 00  ---          05 20 43  61.4  45.1 -2.0    -115.4   110     5134   09 34 01

09 36 00  B0712+472    05 20 43  62.2  45.3 -1.9    -115.9   -10     5134   09 36 10
09 40 00  ---          05 24 43  62.8  44.7 -1.9    -117.3   230     5193   09 36 01

09 40 00  J0720+473    05 24 43  62.0  44.5 -1.9    -116.7   -10     5193   09 40 10
09 42 00  ---          05 26 44  62.3  44.1 -1.9    -117.3   110     5222   09 40 01

09 42 30  B0712+472    05 27 14  63.2  44.2 -1.8    -118.1    20     5222   09 42 30
09 46 00  ---          05 30 44  63.7  43.6 -1.8    -119.3   210     5276   09 42 31
Schedule for VLBA_FD   (Code Fd )                                   Page  10
               Confirming the detection of a dark matter substructure with Global VLBI
  UP:  D => Below limits;  H => Below horizon mask;  W => still slewing at end;  blank => Up.
  Early: Seconds between end of slew and start.   Dwell: On source seconds. 
  Disk: GBytes recorded to this point.
  TPStart:  Recording start time.  Frequencies are LO sum (band edge).
  SYNC: Time correlator is expected to sync up.
----------------------------------------------------------------------------------------
Start UT  Source               Start / Stop                 Early    Disk   TPStart
Stop UT                  LST      EL    AZ   HA  UP   ParA  Dwell   GBytes    SYNC
----------------------------------------------------------------------------------------

 --- Mon  31 Oct 2016   Day 305 ---

09 46 00  J0720+473    05 30 44  62.9  43.5 -1.8    -118.7   -10     5276   09 46 10
09 48 00  ---          05 32 45  63.2  43.1 -1.8    -119.4   110     5304   09 46 01

09 48 00  B0712+472    05 32 45  64.0  43.2 -1.7    -120.0   -10     5304   09 48 10
09 52 00  ---          05 36 45  64.6  42.4 -1.7    -121.5   230     5363   09 48 01

09 52 00  J0720+473    05 36 45  63.7  42.3 -1.7    -120.8   -10     5363   09 52 10
09 54 00  ---          05 38 45  64.0  41.9 -1.7    -121.5   110     5392   09 52 01

09 54 30  B0712+472    05 39 16  65.0  41.9 -1.6    -122.4    20     5392   09 54 30
09 58 00  ---          05 42 46  65.5  41.1 -1.6    -123.8   210     5446   09 54 31

09 58 00  J0720+473    05 42 46  64.6  41.1 -1.6    -123.0   -10     5446   09 58 10
10 00 00  ---          05 44 46  64.9  40.7 -1.6    -123.8   110     5474   09 58 01

10 00 00  B0712+472    05 44 46  65.8  40.6 -1.5    -124.6   -10     5474   10 00 10
10 04 00  ---          05 48 47  66.3  39.7 -1.5    -126.2   230     5533   10 00 01

10 04 00  J0720+473    05 48 47  65.4  39.8 -1.5    -125.3   -10     5533   10 04 10
10 06 00  ---          05 50 47  65.7  39.3 -1.5    -126.1   110     5562   10 04 01

10 06 30  B0712+472    05 51 18  66.7  39.0 -1.4    -127.2    20     5562   10 06 30
10 10 00  ---          05 54 48  67.1  38.1 -1.4    -128.7   210     5616   10 06 31

10 10 00  J0720+473    05 54 48  66.3  38.3 -1.4    -127.8   -10     5616   10 10 10
10 12 00  ---          05 56 48  66.5  37.8 -1.4    -128.6   110     5644   10 10 01

10 12 00  B0712+472    05 56 48  67.4  37.5 -1.3    -129.6   -10     5644   10 12 10
10 16 00  ---          06 00 49  67.9  36.4 -1.3    -131.4   230     5703   10 12 01

10 16 00  J0720+473    06 00 49  67.1  36.7 -1.3    -130.4   -10     5703   10 16 10
10 18 00  ---          06 02 49  67.3  36.1 -1.3    -131.3   110     5732   10 16 01

10 19 30  DA193        06 04 20  80.7  -9.1  0.1     169.8    51     5732   10 19 30
10 29 00  ---          06 13 51  80.2 -19.7  0.3     157.8   570     5879   10 19 31


SETUP FILE INFORMATION:
   NOTE: If DOPPLER, FREQ, or BW were used, see the individual scans for the final BBC settings.


 ======== Setup file: sess316.L2048glob
   Matching groups in /home/guest/rmc/SCHED/sched11.4/catalogs/freq_RDBE.dat:
     v20cm_2         FD filtered above 1760.  SC filtered above 1740.
    ****** Only  511.50 of  512.00 MHz total bandwidth is within the IFs
           in the setup file before any FREQ or DOPPLER shifts.

   Setup group:    2         Station: VLBA_FD           Total bit rate:  2048
   Format: VDIF              Bits per sample: 2         Sample rate:128.000
   Number of channels:  8    DBE type: RDBE_DDC         Speedup factor:   1.00

   Disk used to record data.

   1st LO=   2400.00   2400.00   2400.00   2400.00   2400.00   2400.00   2400.00   2400.00
   Net SB=         U         U         U         U         U         U         U         U
   IF SB =         L         L         L         L         L         L         L         L
   Pol.  =      RCP       LCP       RCP       LCP       RCP       LCP       RCP       LCP 
   BBC   =         1         2         3         4         5         6         7         8
   BBC SB=         L         L         L         L         L         L         L         L
   IF    =        A         C         A         C         A         C         A         C 

   VLBA FE=     20cm     omit     20cm     omit
   VLBA Synth=  14.6      2.4     14.6

  The following frequency sets based on these setups were used.
     See the crd files for VLBA legacy system setups and pcal detection details.

   Frequency Set:  13  Setup file default.  Used with PCAL = off
   LO sum=   1504.25  1504.25  1568.25  1568.25  1632.25  1632.25  1696.25  1696.25
   BBC fr=    895.75   895.75   831.75   831.75   767.75   767.75   703.75   703.75
   Bandwd=     64.00    64.00    64.00    64.00    64.00    64.00    64.00    64.00
   VLBA legacy crd files using  4 channels based on RDBE channels:   3  4  5  6
   CRD fr=     807.75    807.75    743.75    743.75
   CRD bw=      16.00     16.00     16.00     16.00
    Matching frequency sets:  13  14  15  16  17  18  19  20  22  23

   Track assignments are: 
    track1=   1,  2,  3,  4,  5,  6,  7,  8
    barrel=roll_off 

 POSITIONS OF SOURCES USED IN RECORDING SCANS

   Source                         Source position (RA/Dec)                        Error
                        (B1950)             (J2000)             (Date)            (mas)

 * B0712+472         07 12 21.530378   * 07 16 03.640000     07 17 18.101409       0.00
                     47 14 08.95037    * 47 08 50.15000      47 06 43.35499        0.00
                     From catalog imbedded in main SCHED input file.

 * J0720+473         07 16 38.668004   * 07 20 21.497762     07 21 36.148000       0.00
                     47 43 20.65409    * 47 37 44.12483      47 35 31.23994        0.00
                     From catalog imbedded in main SCHED input file.

   0552+398          05 52 01.407169   * 05 55 30.805611     05 56 41.798805       0.00
   J0555+3948        39 48 21.94581    * 39 48 49.16496      39 48 41.89482        0.00
 * DA193             /home/guest/rmc/SCHED/sched11.4/catalogs/sources.gsfc
   J0555+39          GSFC 2015a astro solution, unpublished 394383 observations.

 * 4C39.25           09 23 55.319215   * 09 27 03.013936     09 28 04.745385       0.30
   J0927+3902        39 15 23.56645    * 39 02 20.85186      38 57 45.47708        0.16
   0923+392          /home/guest/rmc/SCHED/sched11.4/catalogs/sources.gsfc
   J0927+39          GSFC 2015a astro solution, unpublished 245753 observations.



SOURCE SCAN SUMMARY FOR SOURCES LISTED ABOVE

     Scan hours are for recording scans only. 
     Baseline hours are only counted for scans above horizon at both ends.
  Source       Setup file             Frequency sets                  Observing hours
                                   (duplicates not shown)              Scan  Baseline
  B0712+472  sess316.L2048glob     1 2 3 4 5 6 7 8 10 11 13 21       8.117   952.805
  J0720+473  sess316.L2048glob     1 2 3 4 5 6 7 8 10 11 13 21       4.341   432.816
  DA193      sess316.L2048glob     1 2 3 4 5 6 7 8 10 11 13 21       0.469    59.707
  4C39.25    sess316.L2048glob     1 2 3 4 5 6 7 8 10 11 13 21       0.272    34.344


EFFECT OF SOLAR CORONA

  The solar corona can cause unstable phases for sources too close to the Sun.
  SCHED provides warnings at individual scans for distances less than 10 degrees.
  The distance from the Sun to each source in this schedule is:
    Source         Sun distance (deg) 
   B0712+472          111.6
   J0720+473          110.9
   DA193              127.0
   4C39.25             86.8

  Barry Clark estimates from predictions by Ketan Desai of IPM scattering sizes 
  that the Sun will cause amplitude reductions on the  longest VLBA baselines 
  at a solar distance of 60deg F^(-0.6) where F is in GHz. 
  For common VLBI bands, this is: 
       327 MHz        117. deg 
       610 MHz         81. deg 
       1.6 GHz         45. deg 
       2.3 GHz         36. deg 
       5.0 GHz         23. deg 
       8.4 GHz         17. deg 
      15.0 GHz         12. deg 
      22.0 GHz          9. deg 
      43.0 GHz          6. deg 

