!*  Schedule for VLBA_FD   *!
!*  Experiment F13K1    *!
!* Schedule Version:       1.00 *!
!* Processed by SCHED version:  11.00  Release of Feb. 15, 2013 *!
!* PI:       Bob Campbell *!
!* Address:  JIVE *!
!*           Oude Hoogeveensedijk 4 *!
!*           7991PD  Dwingeloo *!
!*  *!
!* Phone:    +31 521 596-534 *!
!* EMAIL:    campbell@jive.nl *!
!* Fax: *!
!* Phone during observation: +31 521 596-534 *!
!* Observing mode: *!
!* Notes: *!
!*  *!
!*  *!
!*  *!
!*  Start at 06h00m00s     Wed, 2013 Jun 12  Day of year  163   *!
program=F13K1   

diskformat=mark5c
media=(1,disk)

!* The first scan is preceeded by a setup scan *!
!* that ends at the start time of the first scan  *!

!* --- Scan from 06h00m00s to 06h12m00s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
maxcaltime= 120
fe=(2,1cm),(4,1cm)
fexfer=(2,norm)
noise=(1,low-s),(2,low-s),(3,low-s),(4,low-s)
synth=( 1, 9.1),( 2,15.1),( 3,12.4)
logging=STANDARD
nchan= 4
format=VLBA1:4
ifdistr=(1,0),(2,0),(3,0),(4,0)
baseband=(1,1),(2,2),(3,3),(4,4)
ifchan=(1,B),(2,D),(3,B),(4,D)
sideband=(1,U),(2,U),(3,U),(4,U)
bits=(1,2),(2,2),(3,2),(4,2)
period=(1,1),(2,1),(3,1),(4,1)
level=(1,-1),(2,-1),(3,-1),(4,-1)
azcolim=   0.00  elcolim=   0.00
bbsynth=( 1,695.25),( 2,695.25),( 3,759.25),( 4,759.25)
bbfilter=(1,16M),(2,16M),(3,16M),(4,16M)
pcal=1MHZ
pcalxbit1=(1,S1),(2,S3)
pcalxbit2=(1,S2),(2,S4)
pcalxfreq1=(1,750),(2,750)
pcalxfreq2=(1,750),(2,750)
samplerate=32M
disk=off
  date = 2013Jun12
stop=06h00m00s   !NEXT!        
qual=  0
disk=off
stop=06h12m00s   !NEXT!

!* --- Scan from 06h12m26s to 06h14m06s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h12m26s   !NEXT!        
qual=  0
disk=off
stop=06h14m06s   !NEXT!

!* --- Scan from 06h14m26s to 06h18m36s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h14m26s   !NEXT!        
qual=  0
disk=off
stop=06h18m36s   !NEXT!

!* --- Scan from 06h18m56s to 06h23m06s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h18m56s   !NEXT!        
qual=  0
disk=off
stop=06h23m06s   !NEXT!

!* --- Scan from 06h23m26s to 06h25m06s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h23m26s   !NEXT!        
qual=  0
disk=off
stop=06h25m06s   !NEXT!

!* --- Scan from 06h25m26s to 06h29m36s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h25m26s   !NEXT!        
qual=  0
disk=off
stop=06h29m36s   !NEXT!

!* --- Scan from 06h29m56s to 06h34m06s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h29m56s   !NEXT!        
qual=  0
disk=off
stop=06h34m06s   !NEXT!

!* --- Scan from 06h37m06s to 06h38m46s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
bbsynth=( 1,711.25),( 2,711.25),( 3,743.25),( 4,743.25)
disk=off
stop=06h37m06s   !NEXT!        
qual=  0
disk=off
stop=06h38m46s   !NEXT!

!* --- Scan from 06h39m06s to 06h43m16s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h39m06s   !NEXT!        
qual=  0
disk=off
stop=06h43m16s   !NEXT!

!* --- Scan from 06h43m36s to 06h47m46s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h43m36s   !NEXT!        
qual=  0
disk=off
stop=06h47m46s   !NEXT!

!* --- Scan from 06h48m06s to 06h49m46s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h48m06s   !NEXT!        
qual=  0
disk=off
stop=06h49m46s   !NEXT!

!* --- Scan from 06h50m06s to 06h54m16s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h50m06s   !NEXT!        
qual=  0
disk=off
stop=06h54m16s   !NEXT!

!* --- Scan from 06h54m36s to 06h58m46s   Wed, 2013 Jun 12 --- *!
sname='J2005+7752'  ra=20h05m30.998498s  dec= 77d52'43.24753"  qual=999  calib='V'
disk=off
stop=06h54m36s   !NEXT!        
qual=  0
disk=off
stop=06h58m46s   !NEXT!
disk=off
stop=06h58m51s   !NEXT!
     !QUIT! 
