!*  Schedule for VLBA_FD   *!
!*  Experiment gs042    *!
!* Schedule Version:       1.00 *!
!* Processed by SCHED version:  11.40  Release 11.4.  March 14, 2015 *!
!* PI:       Tuomas Savolainen *!
!* Address:  Aalto University Metsahovi Radio Observatory *!
!*           Metsahovintie 114, 02540 Kylmala, Finland *!
!*  *!
!*  *!
!* Phone:    +358505819717 *!
!* EMAIL:    tuomas.k.savolainen@aalto.fi *!
!* Fax: *!
!* Phone during observation: +358505819717 *!
!* Observing mode: K-band dual-pol *!
!* Notes:    K-band, Radioastron-compatible frequency setup *!
!*           P-CAL is ON *!
!*           Tsys is ON *!
!*           auto-level (AGC) is ON *!
!*  Start at 21h40m00s     Mon, 2018 May 14  Day of year  134   *!
program=gs042   

diskformat=mark5c
media=(1,disk)

!* The first scan is preceeded by a setup scan *!
!* that ends at the start time of the first scan  *!

!* --- Scan from 21h40m00s to 21h56m40s   Mon, 2018 May 14 --- *!
!*  K-band VLBI scans. Space segment 04: 1228+126  *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
maxcaltime= 120
fe=(2,1cm),(4,1cm)
fexfer=(2,norm)
noise=(1,low-s),(2,low-s),(3,low-s),(4,low-s)
synth=( 1, 9.1),( 2, 6.1),( 3,12.4)
logging=STANDARD
nchan= 4
format=VLBA1:4
ifdistr=(1,0),(2,0),(3,0),(4,0)
baseband=(1,1),(2,2),(3,3),(4,4)
ifchan=(1,B),(2,D),(3,B),(4,D)
sideband=(1,L),(2,L),(3,U),(4,U)
bits=(1,2),(2,2),(3,2),(4,2)
period=(1,1),(2,1),(3,1),(4,1)
level=(1,-1),(2,-1),(3,-1),(4,-1)
azcolim=   0.00  elcolim=   0.00
bbsynth=( 1,736.01),( 2,736.01),( 3,735.99),( 4,735.99)
bbfilter=(1,16M),(2,16M),(3,16M),(4,16M)
pcal=1MHZ
pcalxbit1=(1,S1),(2,S3),(3,S1),(4,S3),(5,S1),(6,S2),(7,S3),(8,S4)
pcalxbit2=(1,S2),(2,S4),(3,S2),(4,S4),(5,M1),(6,M2),(7,M3),(8,M4)
pcalxfreq1=(1,10),(2,10),(3,13010),(4,13010),(5,0),(6,0),(7,0),(8,0)
pcalxfreq2=(1,10),(2,10),(3,13010),(4,13010),(5,0),(6,0),(7,0),(8,0)
samplerate=32M
disk=off
  date = 2018May14
stop=21h40m00s   !NEXT!        
qual=  0
disk=off
stop=21h56m40s   !NEXT!

!* --- Scan from 21h57m20s to 22h13m20s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
disk=off
stop=21h57m20s   !NEXT!        
qual=  0
disk=off
stop=22h13m20s   !NEXT!

!* --- Scan from 22h14m00s to 22h30m00s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
disk=off
stop=22h14m00s   !NEXT!        
qual=  0
disk=off
stop=22h30m00s   !NEXT!

!* --- Scan from 22h35m00s to 22h37m00s   Mon, 2018 May 14 --- *!
sname='1156+295'  ra=11h59m31.833913s  dec= 29d14'43.82678"  qual=999  calib=' '
disk=off
stop=22h35m00s   !NEXT!        
qual=  0
disk=off
stop=22h37m00s   !NEXT!

!* --- Scan from 22h38m40s to 22h42m40s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
disk=off
stop=22h38m40s   !NEXT!        
qual=  0
disk=off
stop=22h42m40s   !NEXT!

!* --- Scan from 22h43m30s to 22h52m00s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
fe=(1,7mm),(3,7mm)
synth=( 1, 3.9),( 2, 7.6),( 3,11.6)
ifchan=(1,A),(2,C),(3,A),(4,C)
bbsynth=( 1,727.25),( 2,727.25),( 3,727.25),( 4,727.25)
pcalxfreq1=(1,250),(2,750),(3,13250),(4,13750)
pcalxfreq2=(1,250),(2,750),(3,13250),(4,13750)
disk=off
stop=22h43m30s   !NEXT!        
qual=  0
disk=off
stop=22h52m00s   !NEXT!

!* --- Scan from 22h52m40s to 22h56m40s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
fe=(2,1cm),(4,1cm)
synth=( 1, 9.1),( 2, 6.1),( 3,12.4)
ifchan=(1,B),(2,D),(3,B),(4,D)
bbsynth=( 1,736.01),( 2,736.01),( 3,735.99),( 4,735.99)
pcalxfreq1=(1,10),(2,10),(3,13010),(4,13010)
pcalxfreq2=(1,10),(2,10),(3,13010),(4,13010)
disk=off
stop=22h52m40s   !NEXT!        
qual=  0
disk=off
stop=22h56m40s   !NEXT!

!* --- Scan from 22h57m30s to 23h10m00s   Mon, 2018 May 14 --- *!
sname='1228+126'  ra=12h30m49.423382s  dec= 12d23'28.04365"  qual=999  calib=' '
fe=(1,7mm),(3,7mm)
synth=( 1, 3.9),( 2, 7.6),( 3,11.6)
ifchan=(1,A),(2,C),(3,A),(4,C)
bbsynth=( 1,727.25),( 2,727.25),( 3,727.25),( 4,727.25)
pcalxfreq1=(1,250),(2,750),(3,13250),(4,13750)
pcalxfreq2=(1,250),(2,750),(3,13250),(4,13750)
disk=off
stop=22h57m30s   !NEXT!        
qual=  0
disk=off
stop=23h10m00s   !NEXT!
disk=off
stop=23h10m05s   !NEXT!
     !QUIT! 
